)c (GeV/ Tp 1 10

-2)c

(GeV/ yd_Tpd_Tp

N^2d e_v Nπ2 1

-9 10

-8 10 -7 10

-6 10

-5 10 -4 10 -3 10

-2 10 -1 10 1 10 210 310 410

7 2×

= 2.76 TeV NNs 0- 5% Pb-Pb _5 2× = 2.76 TeV NNs 5-10% Pb-Pb _3 2× = 2.76 TeV NNs 10-20% Pb-Pb _2 2× = 2.76 TeV NNs 20-40% Pb-Pb _1 2× = 2.76 TeV NNs 40-60% Pb-Pb _0 2× = 2.76 TeV NNs 60-80% Pb-Pb fits to Pb-Pb

= 2.76 TeV s pp Tsallis fit power law fit